Copyright: (c) 2001-2002 Icom Inc.


 IMPORTANT

When first using this software:

Push [image] to read all transceiver cloning data into the PC before starting to edit with this cloning software.

Otherwise, the cloning data may not be cloned correctly to the transceiver.

(e.g. Memory CH, MSK, DTMF, etc.)

Introduction

CS-F500 cloning software is designed to perform data setting and cloning for IC-F510/F520/F610/F620 VHF/UHF FM TRANSCEIVERS.

- Launching the CS-F500 Cloning software: (Using Windows 95/98/Me)

1. Before launching the program, make sure the transceiver power is turned on.

2. Click the [Start] button and point to [Programs].

3. Point to the CS-F500 folder.

4. Click the CS-F500 program.

• NOTE:

 - If the "No answer from transceiver" dialog box appears while the program is paused and the transceiver power is on, activate the program again.

 - If the problem persists, check the connection between the computer and transceiver as well as the RS-232C port.

- Quitting the CS-F500 program

Select [Exit (X)] in the [File (F)] menu or click the [Close (X)] button in the title bar.

Windows is a registered trademark of the Microsoft Corporation in the U.S.A. and the other countries.

Windows 95/98/Me are Microsoft trademarks.

Opening screen

There are 6 function menus, Tool bar, Tree View screen and a Program screen in the Opening screen.


 File (F)

• New (N) [image]  (Ctrl+N)

- Creates a new file.

• Open (O) [image]  (Ctrl+O)

- Loads an ICF (Icom Cloning Format) file.

• Save (S) [image]  (Ctrl+S)

- Saves the current file, if you haven't previously saved the file. Type a name for the file in the File Name box.

• Save As... (A)

- Saves a file with a different name or format.

• Print	(P)

- Printouts the programmed information.

• Current sheet... (C): Print the displayed programming sheet.

• All... (A): Print all sheets.

• Recent File

- Lists the latest files.

• Exit (X) (Alt+F4)

- Quits this program.

When saving an ICF file, any cloning comment specified in the Common screen is also saved in the file for future reference.


View (V)

• Font Size (S)

Font has 5 sizes.

- Click to indicate the sizes list window, then make a selection.

• Toolbar (T)

Toolbar has 6 useful shortcut keys.

: Create a new file.

: Loads an ICF (Icom Cloning Format) file.

: Saves the current file.

: Reads the data from the transceiver.

: Writes the data to the transceiver.

: Displays the clone information.


COM Port (P)

- Select the desired COM port.

- Select Normal Speed, when the clone error occurs at the High Speed.

Normal Speed: 9600bps

High Speed: 38400bps

When "More..." is selected, the "Communication COM Port Setting" dialog box appears as follows.

- Enter the desired COM port number 1-256, and then click [OK].


Clone (C)

Connect the transceiver with the following optional cloning cables for reading or writing data between the transceiver and a PC.

Optional OPC-1122 is required.

• Read (R) [image]  <- TR

- Reads the data from the transceiver.

• Write (W) [image]  -> TR

- Writes the data to the transceiver.

• Information (I)

- "Information" allows you to read the connected transceiver type, installed option(s) as well as any programmed comments (set in the Common setting), etc.


Model (M)

Select the model name which you are going to clone.

LMR (2Tone), PMR (5Tone/DTMF) or BIIS PMR is available.


 Help (H)

Click Help (H) then click About CS-F500 to display the software revision number.


Program Screen

- Program screen shows selected screen information.

- Select an appropriate item in the program screen, and then right click to display the [Edit...  Enter] menu or double left click the desired cell.

- Editable items (e.g. Atr, Inh, RX/TX Frequency, etc.) appear depending on the screen.

- The channel information is editable directly and can be Copy, Paste, Up, Down, Clear, Delete and Insert.


Memory CH

Bank Operation

Bank


 Bank Operation

• SmarTrunk

Set the SmarTrunk function ON or OFF.  "S" appears upper-right of the Bank icon when the SmarTrunk mode is selected.

• NOTE:

1. SmarTrunk mode can be selected for each Bank. Max 16 banks are available.

2. When turning SmarTrunk mode ON, set all functions which will not be used for trunking operations OFF. Otherwise, the SmarTrunk system will not function properly.

3. An optional UT-105 SmarTrunkII Logic Board is necessary to use the SmarTrunk mode.

• Capa

Setup the usable max Bank CH number.

• Use

The actual programmed channel numbers.


 Bank

• Atr

• Inh

• Frequency (MHz)

• W/N

• C.Tone

• Text

• Compander

• TOT

• RF Pwr

• Lock-out

• Scan List

• Signal (BIIS PMR)

• Auto Reset

• 2Tone (LMR)

• CH Mute (PMR, BIIS PMR)

• Log (LMR)

• Log-In/Off (PMR, BIIS PMR)

• Send Status (BIIS PMR)

• Switch Action (PMR, BIIS PMR)

• MSK Signaling (BIIS PMR)

• 5Tone Signaling (PMR, BIIS PMR)

• Scrambler


MSK

ID Range

Own ID/Group

Call List

Timing & Error

Config.

Message


 ID Range

ID

• Individual

Sets the Individual ID within 0000 to 3999 (default) for individual calls. In the same system, the same ID range should be set.

• Group

Sets the Group ID within 0001 to 4095 for group calls.

(Start: 4000, End: 4095 is default)

When the Group ID is set, the Individual ID range is set automatically.

• Common

Sets the Common ID for BIIS version transceivers.

When the call signals of Common ID is matched up to Individual ID or Group ID call signal, the communication is possible.

• Country Code

Selects the desired country code from the list. Select "---: (Others)" if the desired country code is not available.

• Killer ID

Sets the Killer ID which inhibits the transceiver's transmitting/receiving.

For programming a Killer ID of up to 4 digits.


 Own ID/Group

ID Code

• ID

Sets the Own ID to No. 0 within the Individual ID range. for stand-by mode.

Sets the Group ID to receive the call from No.1 to No.7. The group number, waiting for a call is set by the Receive ID.

For programming of up to 4 digits.

• Display Text

Decode Action

• Alert

Emits (or turns OFF) the following beeps as alerts when receiving a matched Own ID or Group ID.

Null: (Retain Beep)

Beep emission (or non emission) is retained even when receiving a matched Own ID or Group ID.

OFF: (Turn off Beep)

Repeated beep emission is turned OFF.

Pi: (Single)

1 high beeps once.

PiPi: (Single)

2 high beep once.

PiRo: (Single)

1 high and 1 low beep 3 times.

Pi/R: (Repeat)

1 high beep repeated at the selected intervals.

PiPi/R: (Repeat)

2 high beeps repeated at the selected intervals.

PiRo/R: (Repeat)

1 high, 1 low beep 3 times, repeated at the selected intervals.

• Bell Icon

Selects the bell indicator condition when receiving a matched Own ID or Group ID.

OFF  : The bell indicator goes off.

ON    : The bell indicator appears until operating a key.

Blink : The bell indicator blinks until operating a key.


 Call List

• ID

Set the transmission ID as the call code list for MSK channel operation.

Set the Own ID and Group ID for other mobile or base station.

Program the ID with up to 4 digits.

• Input Digit

Select an appropriate number. Then right click to display the [Edit... Enter] menu and click [Edit... Enter].

Double-click the desired numbers to the check-box.

• Text

• Update

The contents of the Call List ID can be overwritten when using the [TX Code Enter] function.

Selectable value:

Disable

- The original contents are not changed and the [TX Code Enter] key changes the code temporarily.

Enable

- The original contents are overwritten when using the [TX Code Enter] key.

• Sel

Set the list selection from Disable or Enable.


 Timing & Error

Call Parameter

• NA

Sets the maximum number of regular calls of a call operation acknowledgement from 1 to 8 times.

1 is the recommended setting.

• NM

Sets the maximum number of regular calls of a call operation from 1 to 8 times.

1 is the recommended setting.

• NR

Sets the maximum number of regular calls from 1 to 8 when a call was unsuccessful, or an acknowledgement was not received.

• TAC

Sets the maximum wait time until an acknowledgement is received during call operation within 0.01 to 2.55.

• Call LET Timer

Set the non-modulation time until the start up of a FFSK signal modulation when transmitting a call.

• Ack LET Timer

Sets the non-modulation time until the start up of a FFSK signal modulation when transmitting a call acknowledgement.

• Busy Check Timer

Sets the time transmission wait time while receiving a signal.

When received signal finishes within this set period, status transmitting starts. However, if the signal receiving time is longer than this set period, status transmitting is canceled.

- Max. 255 sec. can be set.

- Set 0 to cancel transmitting when receiving a signal.


Config.
 MSK-Config.

Encode Setting

• PTT Call

Select "Enable" to set the PTT as the call button for on an MSK channel.

• Pre-Emphasis

Select the FFSK signal modulation type from PM or FM.

• SYNC Word

Sets the synchronized signal for the BIIS version.

ANI

• PTT Side Tone

Set to emit a beep to announce the communication timing after outputting a MSK signal when "L-INA" is selected by the Log-In/Off.

Decode Setting

• Beep/Alert Timer

Sets the Beep/Alert repeat time when the Beep/Alert function is set to repeat in Status-Beep or Own ID/Group-Decode Action Alert screen.

• Mute MSK Tone

To mute MSK tone function available during the other mute function is deactivated to mute the harsh MSK signal.

Set to "ON" to mute an annoying MSK signal noise during communication.

Status Setting

• Fixed Base ID

Sets the Base ID of the station to transmit the status call to this station.

• Send Status on PrioA CH

Set "Enable" to send a status message on priority channel A.

• Power ON Status23

Set "Enable" to transmit the Status 23 when turning the power ON.

• Power OFF Status19

Set "Enable" to transmit the Status 19 when turning the power OFF.

GPS Setting

• Fixed Base ID

Set the Station ID of the station to transmit the GPS position data to this station.

• Send GPS fix to Base

Selects "Enable" to transmit the GPS position data to the fix base ID.

• Auto

Select "Enable" to automatically transmit the GPS position data in the Interval Timer setting.

• Time Marker [mm:ss]

Set the Marker time to the GPS position data is automatically transmitted from the Marker time based on UTC time (each hour).

Set each transceiver's Marker time different from the GPS position data to be transmitted automatically.

• Interval Timer [mm:ss]

Set the Interval time based on Marker time for the GPS position data to be transmitted automatically.

• Send with Logoff

Select "Enable" to transmit the GPS position data after a logoff transmission.

• Send with Status

Select "Enable" to transmit the GPS position data after a status transmission.

• Send with SDM

Select "Enable" to transmit the GPS position data after a SDM transmission.

• Send with Emergency

Select "Enable" to transmit the GPS position data after a status 22 transmission with [Emergency] switch.

• Sentence

Select the GPS position data sentence to be transmitted.

Selectable value: $GPRMC, $GPGGA or $GPGLL


Message

Status

SDM


 Status

RX Status

• Display Text

• Beep

Emits (or turns OFF) the following beeps when receiving a matched status call.

Null: (Retain Beep)

Beep emission (or non emission) is retained even when receiving a matched status call.

OFF: (Turn off Beep)

Repeated beep emission is turned OFF.

Pi: (Single)

1 high beeps once.

PiPi: (Single)

2 high beep once.

PiRo: (Single)

1 high and 1 low beep 3 times.

Pi/R: (Repeat)

1 high beep repeated at the selected intervals.

PiPi/R: (Repeat)

2 high beeps repeated at the selected intervals.

PiRo/R: (Repeat)

1 high, 1 low beep 3 times, repeated at the selected intervals.

• Horn

When receiving a status call, the Horn drive control is turned ON. An optional cable, OPC-617 and external connection is necessary.

EXO activates as Horn drive output.

• Auto TX

Select the Auto TX condition ON or OFF.

• NOTE: When the optional HM-100TN DTMF microphone is used, this function is not available.

TX Status

• Display Text

• Priority

Select "High" to transmit a status call even if the channel is busy.

Select "Normal" to not transmit a status call while the channel busy.

When received signal finishes within set period in the Busy Check Timer on the MSK Timing & Error screen, transmitting starts. However, if the signal receiving time is longer than this set period, transmitting is canceled.

• Sel

When selecting a status with the Up/Down key, you can set the transceiver so that the selected list does not appear on the display.


 SDM

Sets a SDM (Short Data Message) of up to 10 digits.

Select an appropriate number. Then right click to display the [Edit... Enter] menu and click [Edit... Enter].

Double click the desired characters from the table.

• Push [Space] to pick up the character .

• Push [Enter] to finish editing.

Max. 10 characters are selectable.

Selectable character list as below.

- You can use the character that is edited in the Character Editor Screen.


DTMF

DTMF Autodial

DTMF Setting


DTMF Autodial
 DTMF-Autodial

• No.

LMR: 1-6, Emergency and Log/ID.

(Channels "Emergency" and "Log/ID" can be used as channel 7 and 8 respectively)

PMR, BIIS PMR: 1-8

• Code

For programming DTMF codes up to 24 digits.

Select the desired dial number, and then enter the desired DTMF codes in the dial number board directly.

The usable characters: 0 to 9, A, B, C, D, E (*) and F (#)

• Text


DTMF Setting
 DTMF-Setting

• DTMF Timer

- Sets the tone period for each code emission and interval.

• First Timer

- Sets the tone period for the 1st DTMF code corresponding to a scanning transceiver or the power saver function of a portable transceiver.

• * # Timer

- Sets the tone period for [*] (same as "E") and [#] (same as "F").

- These codes may be used for control codes depending on the signaling system.


Continuous Tone

Continuous Tone-Setting


 Continuous Tone

• RX/TX

For CTCSS frequency selection:

Select an appropriate item. Then right click to display the [Edit... Enter] menu and select Copy, Paste, Up, Down Clear, Delete and Insert.

Click [Edit... Enter] to display the CTCSS frequency table.

- Select appropriate tone frequency.

- Select "USER" to use user CTCSS frequency.

- Select "DTCS" to use DTCS Tone frequency.

For DTCS selection: (Recommend code list is as below.)

Enter desired 3digits code number directly.

N: for normal polarity

I: for inverse polarity.

• NOTE:

Set TAC, Call/Ack LET timer (in MSK-Timing&Error) desired time plus 300 m sec. larger to use CTCSS/DTCS in MSK channel.


 Continuous Tone-Setting

• Tone Burst

 - Selects the modulation for a period of "CTCSS Reverse Burst Timer".

Notone: No modulation during the period.

Phase: Reversed phase modulation during the period.

• CTCSS Reverse Burst Timer

 - This setting is effective when the CTCSS function is used.

When the PTT is released, the transceiver still transmits for this set period without the CTCSS encoder.

This removes the transceiver's 'squelch tail'.

• User CTCSS Freq (Hz)

- Sets the user CTCSS tone frequency from 60.0 to 300.0 Hz.

- Nearest available frequency is selected automatically.

• TX DTCS Inverse

- Selects the transmit DTCS code polarity.

In order for transceivers to communicate using DTCS codes, the polarity of the transmitting transceiver's transmit code must be the same as the polarity of the receiving transceiver's receive code.

• RX DTCS Inverse

- Selects the receive DTCS code polarity.

In order for transceivers to communicate using DTCS codes, the polarity of the receiving transceiver's receive code must be the same as the polarity of the transmitting transceiver's transmit code.

• RX AF Filter

 - Turns the low-cut filter circuit (high-pass filter) in the receiver ON and OFF.

This item should be turned ON when the CTCSS or DTCS is being used to filter out the superimposed frequencies.


SCAN

Scan List

Scan Setting


 Scan List

• Scan Mode

Scan OFF

Deactivates the selected list. The list cannot be selected from the transceiver front panel.

Mode 1: Normal

Scan proceeds in sequence from lower to higher channel numbers.

Mode 2: Prio-A

Busy channel selection when scan is canceled.

Scan proceeds in sequence while checking priority channel A.

When scan is canceled during signal reception the paused channel is retained.

Mode 3: Prio-A

Priority channel selection when scan is canceled.

Scan proceeds in sequence while checking priority channel A.

When scan is canceled during signal reception the priority channel A is selected.

• Text

• Text ON

The set text appears during scan. Operating channel's text (or number) appears while scan is paused.


 Scan Setting

Timer

• Stop

This setting is effective only when a priority scan, Mode-2 or Mode-3, is selected.

When the priority scan is paused on a busy channel, the scan becomes priority watch to check the priority channel A.

This item sets the period paused on a busy channel (watching interval).

• Resume

Scan pauses on a busy channel and resumes when the signal disappears.

This item sets the period from when the signal disappears to when the scan resumes.

• Fast Scan

Sets the scanning period for each channel without CTCSS/DTCS programming.

An appropriate time is set by default and scan may not stop when setting a value less than the default.

• Slow Scan

Sets the scanning period for each channel with CTCSS/DTCS programming.

An appropriate time is set by default and scan may not stop when setting a value less than the default.

• Power ON Scan

The scan function is started automatically when the transceiver power is turned ON.

• Auto CH Call (PMR)

When pushing the [Call] key, the transceiver starts scan, then detects an empty channel (non-busy channel), then transmits the 5-tone code.

• NOTE:

- The previously transmitted 'station code' is used in the 5Tone encoder sequence.

- An empty channel is detected from the selected scan list.

- [Call A] and [Call B] keys have no relation with this function.


2TONE

RX Code CH

RX Code Setting

TX Code


 RX Code CH

Freq (Hz)

• 1st/2nd

Enter the tone frequency within 250 to 3300 Hz range for each 1st and 2nd.

The nearest available frequency is selected automatically.

• Group Call

Tone frequencies cannot be set since the same tones are used for other channels.

Group call is detected for tone length according to the "Group Timer" item in the RX Code Setting screen.

• Text

• Bell

- Select the bell indicator condition when receiving a matched 2Tone.

Null : The bell indicator condition is not changed even when a matched code is received.

OFF : The bell indicator goes off.

ON   : The bell indicator appears until operating a key.

Blink: The bell indicator blinks until operating a key.

• ANS

Turns the answer back function ON and OFF.

The function transmits 1 kHz single tone for 2 sec. when receiving a matched 2Tone.

• EXO (External Output)

An optional cable, OPC-617 and external connection is necessary.

Activates an external buzzer, horn honk, etc., when receiving a matched 2Tone.

The activation time can be set in the EXO/Horn timer item in the Common screen.

• Beep

Emits (or turns OFF) the following beeps when receiving a matched 2Tone.

Null	: Beep emission (or non emission) is retained even when receiving a matched 2Tone.

OFF	: Repeated beep emission is turned OFF.

Pi	: 1 high beeps once.

PiPi	: 2 high beep once.

PiRo	: 1 high and 1 low beep 3 times.

Pi/R	: 1 high beep repeated at the selected intervals*.

PiPi/R	: 2 high beeps repeated at the selected intervals*.

PiRo/R: 1 high, 1 low beep 3 times, repeated at the selected intervals*.

* Intervals set in the "Beep Repeat Timer" in the 2Tone RX Code Setting screen.

• Auto TX

Sets the transceiver to the transmit condition (by activating the microphone) when receiving a matched 2Tone.

- This transmit time can be set in the auto TX timer.

• NOTE:

When the optional HM-100TN DTMF microphone is used, this function is not available.

• Stun

Sets the transceiver to following condition when receiving a matched 2Tone.

OFF: The transceiver can be used continuously.

Kill  : The transceiver cannot be used. Cloning is necessary to activate the transceiver.

Stun: User password prompt appears. When user does not know, the transceiver cannot be used.

• Scan

Select the following scan condition when receiving a matched 2Tone.

Null     : Scan condition is unaffected.

Cancel : Cancels the scan.

Start    : Starts the scan.


 RX Code Setting

Timer

• Notone

This item sets the acceptable period between 2Tones.

When received tones are interrupted for longer than this setting, the transceiver does not detect the code.

• Group

This item sets the 2Tone decoding period.

When the received tone is longer than this setting, the transceiver detects the tone as a group code.

• Beep Repeat

When "Repeat" is selected in the "Beep" column in 2Tone RX Code CH screen, beeps are repeated at this set interval.

• Auto TX

When the Auto TX function is turned ON, the transceiver transmits for this set period when receiving a matched 2Tone code.

• "0" input selects no transmission.


 TX Code

• Code Type

This item selects "Group" type or "Individual" type.

• 1st Tone/2nd Tone-Frequency

Enter the tone code frequency within 250 to 3300 Hz range each for 1st and 2nd.

The nearest available frequency is selected automatically.

• 1st Tone/2nd Tone-Period

Enter the tone period for each digit tone signal emission length.


5TONE

RX Code CH

RX Code Setting

TX Code CH

TX Code Setting

Format

User Tone


 RX Code CH

• RX Code

Group code number cannot be set since the 5Tone decoder detects the other RX codes for a group code when the received 5Tone contains one or more group code characters (G or *).

- When inputting "+" instead of number(s), the digits are used for the status function, which indicates a number message.

Any number is accepted for decoding and indicated on the display instead of programmed text or decoded ID when receiving the call.

• Text

• ID Dec

Select the ID-Dec function ON or OFF which indicates the receive ID code on the LCD.

• Bell

Select the bell indicator condition when receiving a matched 5Tone.

Null : The bell indicator condition is not changed even when a matched code is received.

OFF : The bell indicator goes off.

ON   : The bell indicator appears until operating a key.

Blink: The bell indicator blinks until operating a key.

• Emer Cancel

When the "emergency repeat" call is performed, the transceiver repeatedly transmits the emergency call at specified intervals.

The emergency call is continued until: Receiving an "emergency cancel" call or turning power OFF.

Selectable Value: ON or OFF.

• ABC

Turns the answer back call ON or OFF and selects the type of call.

Blank (OFF):

- No Answer Back operation.

STN: (Station Code CH)

- Transmits the station code that is assigned to the operating channel.

SGL: (Single Tone)

- Transmits approx. 1 kHz single tone for 2 sec. approx.

xx (num): (Each Code)

- Transmits the specified TX code channel number regardless of the operating channel.

• EXO (External Output)

An optional cable, OPC-617 and external connection is necessary.

Activates an external buzzer, horn honk, etc., when receiving a matched 5Tone.

The activation time can be set in the EXO/Horn timer item in the Common screen.

• Beep

Emits (or turns OFF) the following beeps when receiving a matched 5Tone.

Null	: Beep emission (or non emission) is retained even when receiving a matched 5Tone.

OFF	: Repeated beep emission is turned OFF.

Pi	: 1 high beeps once.

PiPi	: 2 high beep once.

PiRo	: 1 high and 1 low beep 3 times.

Pi/R	: 1 high beep repeated at the selected intervals*.

PiPi/R	: 2 high beeps repeated at the selected intervals*.

PiRo/R: 1 high, 1 low beep 3 times, repeated at the selected intervals*.

* Intervals set in the "Beep Repeat Timer" in the 5Tone RX Code Setting screen.

• Auto TX

Sets the transceiver to the transmit condition (by activating the microphone) when receiving a matched 5Tone.

- This transmit time can be set in the auto TX timer.

• NOTE:

When the optional HM-100TN DTMF microphone is used, this function is not available.

• Aud

This item sets a channel to "Audible" or "Inaudible" mode when receiving a matched 5Tone or does nothing (Null).

• Stun

Sets the transceiver to following condition when receiving a matched 5Tone.

OFF: The transceiver can be used continuously.

Kill  : The transceiver cannot be used. Cloning is necessary to activate the transceiver.

Stun: User password prompt appears. When user does not know the transceiver cannot be used.

• Scan

Select the following scan condition when receiving a matched 5Tone.

Null	: Scan condition is unaffected.

Cancel : Cancels the scan.

Start	: Starts the scan.


 RX Code Setting

Timer

• Link A

Sets the non-modulated time before transmitting an answer back call.

• ID Decode

This item is effective when "ID-Dec" is selected in the "Text or ID-Dec" column.

The ID decode timer is the transceiver accept period to decode a complete ID code received after the station code.

• Beep Repeat

When "Repeat" is selected in the "Beep" column 5Tone RX Code CH screen, beeps are repeated at this set interval.

• Auto TX (Except for BIIS PMR)

When the Auto TX function is turned ON, the transceiver transmits for this set period when receiving a matched 5-tone code.

• "0" input selects no transmission.

• Compare Digit

The 5Tone decoder detects only specified digits (compare digits) and ignores other digits for the decode actions.

• NOTE:

When a "+" (status code) is used in the RX Code column, the digit is not compared even if this item sets the digit.


 TX Code CH

• TX Code

Sets the transmit 5Tone codes for assignment to each operating channel's station, ID and repeater codes.

USABLE KEYS: "0" to "9", "A" to "E" and group code ("G" or "*")

TX code channels 29 to 32 are used for station codes when the following operation is performed:

- CH 29: when [Call B] key is pushed.

- CH 30: when [Call A] key is pushed.

- CH 31: when [Moni] key has reset code 2 (31) capability.

- CH 32: when [Moni] key has reset code 1 (32) capability.

• Input Digit

When the [TX Code Enter] function is assigned to the transceiver, a transmit code can be input manually.  In this case, set the allowable digits for input using this item.

SETTING METHOD:

Select the desired digit, and then click a cell (1-7) to toggle the corresponding input digit ON and OFF.

* Indicated numbers mean key entry accept; non-indicated numbers mean key entry inhibit.

• Text

• Update

The contents of the TX Code can be overwritten when using the [TX Code Enter] function.

OFF

- The original contents are not changed and the [TX Code Enter] key changes the code temporarily.

ON

- The original contents are overwritten when using the [TX Code Enter] key.

• ABC-Dec (Answer Back Code Decode)

This item turns the answer back decode/indication function ON and OFF.

The answer back will be indicated when the specified TX code is used as the station code.

• ABC-Aud (Answer Back Code Audible)

This item sets the transceiver to "Audible" mode when this TX code channel is used, then an answer back code is received.

• Sel (Code Selection)

Turn ON to enable the TX code channel selection from the transceiver's keypad capability for flexible call operation.


 TX Code Setting

Timer

• Long Tone

This setting is used when the long tone function is specified for a repeater, station or ID code in the Memory CH screen.

• Link R/1/2 and Lead out Delay

These timers set the no modulation period between each code and the period before returning to receive.

• ABC Decode

When the "ABC Dec" or "ABC Aud" function is in use, the transceiver waits for an answer back call according to this setting.

• Displayed Digit

This item toggles the display digits ON and OFF.

The display digits determine which digits appear on the display.

• PTT Call at Inaudible

This item sets the PTT switch for the [Call] function when "Inaudible" mode is selected.

Selectable Value: ON or OFF

Special Tone

• Group

The decoder accepts this code regardless of the programmed code.

• Repeat

Used when the same codes are replaced. (e.g. 11111 -> 1E1E1)

• Link 2

Emits the code instead of no modulation between station and ID codes (for link 2 timer). Usable [F] for no modulation.


 Format

• Tone Period

Sets each tone period for a tone encoder.

When a long tone is set, the 1st tone period becomes the long tone timer setting in the TX Code Setting screen.

Set the tone periods from 0 to 0.255 sec. in 0.001 sec. steps.

• Notone Timer

Sets the maximum acceptable tone interval for tone detection between each tone.

When the receive tone interrupts for more than the set time, the continuing code is received as a different code.

Recommended notone time is approx. 1.5 times the tone period time.

• Tone Length

Sets the maximum acceptable length of the tone period for a tone decoder.

Longer tones will not be detected correctly.

Recommended tone length is approx. 1.5 times the tone period time.


 User Tone

• Encode

The relationship between the tone number and tone frequency is fixed. In this screen, special tone frequencies can be programmed.

Set the encode tone frequency from 400 to 3000 Hz.

- Nearest available frequency is selected automatically.

- Recommended decode frequencies are automatically set.

• Decode Low / High

Specify the lower and higher edge of the tone decode frequency range, if you want to change from the recommended range.

• NOTE:

When the "High" frequency is set lower than the "Low" frequency, " [image] " appears on the left side of the both cell.  Reset the frequencies in this case.


Common

Key & Display

Set Mode

Common

Character Editor


Key & Display
 Key & Display Assign

Key Assign

Dealer programmable keys: [L-UP]/[L-DOWN]/[R-UP]/[R-DOWN]/[P0]/[P1]/[P2]/[P3]/[P4]/[OPF0]/[OPF1] and [OPF2].

These keys can each be programmed for one of several functions.

Conventional mode

• Null

No function.

• CH Up/Down

Used for channel selection. Several other settings after pushing specified keys.

• Bank

Changes the bank number using [CH Up]/[CH Down] keys.

• NOTE: "Bank" must be selected in the "MR-CH"  "Bank/Free" item in advance.

• Scan A/B Start/Stop

Push to start or cancel a scan. Push and hold to select the scan list.

• Scan Add/Del (Tag)

Adds or deletes the operating channel to the scan list.

• Prio A

Selects priority channel A.

• Prio A (Rewrite)

Push to select priority channel A. Push and hold to reassign priority channel A.

• Prio B

Selects priority channel B.

• MR-CH 1, MR-CH 2, MR-CH 3, MR-CH 4

Selects operating channels 1 to 4.

• Moni (Audi)

- Activates a function specified in the "Switch action Moni" item in the Memory Channel screen.

- Releases any receive mutes when the key is pushed and held. (If the key has "Audible" mode selection capability.)

• Public Address

Activates the public address function.

* See a service manual for required connections.

• RX Speaker

Outputs the receive audio to an out-of vehicle speaker.

* See a service manual for required connections.

• Lock

Turns the lock function ON and OFF.

• High/Low

Changes the output power from the independent settings of each channel.

• C.Tone CH Ent

Push this key then input a continuous tone memory channel number via the keypad to change the tone frequency.

• Talk Around

Turns the talk around function ON and OFF.

• Wide/Narrow

Push [W/N]. A single beep sounds. Toggle bandwidth between wide and narrow.

• DTMF Autodial

Push to select the DTMF channel. Push and hold to transmit the selected DTMF code.

• Re-dial

Push to send the most recently transmitted DTMF code number.

• Call

- Transmits the 2, 5-Tone or MSK ID code on the selected channel.

- Transmits the 2 or 5-tone or MSK ID code on an empty channel when this key is pushed during scan. (According to the "Auto CH Call" setting in the Scan List screen.

• CallA/B (Code 30/29) (PMR)

Transmits the 5-tone or MSK ID code using TX code channels 30 or 29 for a station code.

• Emergency Single/Repeat

Transmits an emergency call once or repeatedly.

* The emergency channel is specified in the Memory CH screen.

• Emergency Single/Repeat (Silent) (BIIS PMR)

Transmits an emergency status call silently once or repeatedly.

• TX Code Enter

(PMR)

- Changes the contents of the station code using [CH Up]/[CH Down] keys.

* Acceptable input digits and update can be specified in the TX Code CH screen.

(BIIS PMR)

- Changes the contents of the MSK ID code using optional HM-100TN 10 key pads or [CH Up]/[CH Down] keys.

* Acceptable input digits and update can be specified in the Call List screen.

• TX Code CH Select (PMR)

- Selects a station code channel using [CH Up]/[CH Down] keys after pushing this key.

- Push and hold to enter the selected code.

* Selectable channel can be specified in the TX Code CH screen.

• TX Code CH Up/Down (PMR)

Selects a TX code channel directly.

* Selectable channel can be specified in the TX Code CH screen.

• ID-MR Select (PMR)

Push to recall the received 5-tone or ID code. Use [CH Up]/[CH Down] keys for selection.

* Up to 5 IDs can be memorized. Push and hold to erase all of the received ID's.

• Scrambler

To toggle the scrambler function ON or OFF.

• Compander

Push to turn the compander function ON or OFF.

• Hook Scan

When the Hook on Scan function is turned ON, push this key to stop scanning temporarily. Push this key again to re-start scanning.

• User Set Mode

Changes the contents of the items in the User Set Mode using [CH Up]/[CH Down] keys after push and hold this key.

• OPT1/2/3 Out

Sets an optional output port "High" or "Low".

 * A 30-pin connector inside the transceiver has 3 ports for these outputs.

• OPT1/2/3 Momentary

Outputs a "High" or "Low" pulse from an optional output port.

• Sp. Func 1/2

Reserved for future function.

• Digital Button (BIIS PMR)

- To select the other station ID for MSK communication.

- To select Status or SDM.

- To indicate MSK communication record.

• Status Up/Down (BIIS PMR)

Selects a TX status channel directly.

* Selectable channel can be specified in the Status screen.

SmarTrunk mode

• Null

No function.

• Bank

Changes the bank number using [CH Up]/[CH Down] keys.

• Lock

Turns the lock function ON and OFF.

• High/Low

Changes the output power from the independent settings of each channel.

• Trunking Group SW

Push to select the Trunking Group.

• Turbo SpeeDial A/B/C/D

To automatically dial a commonly used number with one push.

• * (CH Up)/ # (CH Down)

Assign key functions to the "*" and "#" keys respectively when SmarTrunk mode is selected.

This function is useful for operating SmarTrunk mode with non-keypad model.

• Compander

Push to turn the compander function ON or OFF.

• Sp Func 1/2

Reserved for future function.

10 Key (BIIS PMR version only)

• Select

Sets the keypad operation.

(Optional HM-100TN DTMF microphone is required)

OFF:

Turns the keypad operation OFF.

ON:

- Turns the keypad operation ON.

- [A], [B], [C] and [D] keys activate same as [P0], [P1], [P2] and [P3].

Status:

Push the keypad to select desired status in MSK channel. Continue to push the keypad to transmit the status.

Beep

• Low/High Freq

Set the Low/High beep tone frequency within 400 to 3000 Hz.

The nearest available frequency is selected automatically.

Display

• Opening Text

This set text appears for 2 sec. when turning the transceiver ON.

To turn power ON without text indication, set this item to blank.

Max. 10 characters are selectable.

Selectable character list as below.

- You can use the character that is edited in the Character Editor Screen.

• MR/Code Display (PMR)

Selects the indication text (or channel number).

MR CH:

Operating channel's text (or channel number when text is not programmed).

TX Code CH:

5Tone TX Code channel's text or Call List's text.

MR CH +TX code CH:

Operating channel number, 5 tone TX Code channel's text or Call List's text (or code/ID when text is not programmed).

• Scroll Timer (BIIS PMR version only)

Set time to display a receiving SDM (Short Data Message), Status and Call.

A message is displayed on the LCD for specified time, then scrolled to the next message.

Selection

• RF Power Selection

MR CH individual

Output power keys, [High], [Low1] and [Low2], select power temporarily.

Returns to the previous power when changing the channel.

Override

Output power keys select the power permanently.

• Power SW

Set the power switch disable or enable.

Inhibit: The power switch inhibits to turn the power OFF.

Enable: The power switch enables to turn the power ON and OFF.

Ignition SW

• Ignition SW

The transceiver power is turned ON/OFF automatically when the Ignition switch is turned ON/OFF.

• Delay Timer [mm:ss]

The transceiver is turned OFF automatically after this set period from the Ignition switch is turned OFF.

Move to Prio A CH

• Power SW ON

Select Enable to move set the priority channel A automatically when turning the power ON.

• Clear Down (BIIS PMR version only)

Select Enable to move to the priority channel A automatically after 'Clear Down' transmission in BIIS version.

• Hook off

Select Enable to move set the priority channel A automatically when taking the microphone from its hanger (hanger-off).

Hanger Action

• Hook off Monitor

Select "ON" to activate the function specified in the "Switch action Moni" item in the Memory Channel screen at hanger-off.

• Hook on Scan

Select "ON" to start scanning at hanger-on.


 Set Mode

Value

- Select the desired item, then right click to display the [Edit... Enter] bar, click Edit to enter the adjust mode. Then adjust the appropriate setting.

Enable/Disable

- For setting the following items in the transceiver's user set mode to "Enable" or "Disable". When "Disable" is selected, the selected item does not appear, and therefore cannot be set in the transceiver's user set mode.

• NOTE: Push and hold [User Set Mode] key to enter the Set Mode and changes the contents of the items using [CH Up]/[CH Down] keys.

• Backlight

- Select the backlight condition.

OFF: No backlight available.

Dim: Backlight lights dimly.

Auto: Backlight turns off automatically.

ON: Backlight turns ON continuously.

• Beep

- The confirmation beeps can be turned ON and OFF.

• NOTE:  That some beeps, such as for the lockout timer, cannot be turned OFF.

• Beep Level

- Select the beep level: 1 to 5 or 1(Linked) to 5(Linked)

• SQL Level

 - Adjust the squelch level; selectable value 0 to 255

• AF Min Level

- Adjust the minimum AF level; selectable value 0 to 255

• Audio Filter

- Select the Audio Filter.

Selectable value: 300-3000Hz, 0-3000Hz, 300-3400Hz or 0-3400Hz

• Mic Gain

- Adjust the Mic gain level; selectable value 1 (Min) to 5 (Max)

• Horn

- When "OFF" is selected, the EXO function in 2/5Tone screen and Horn function in MSK-Status screen are turned OFF temporarily.


Common

Clone Comment (1)/(2)

This item allows you to program a comment for quick identification of a transceiver's contents.

When you connect a transceiver to a PC using cloning cables, you can check the transceiver's comment without reading all programmed data.

This item allows you to edit a comment with up to 16 characters.

Security

• User Password

- Set the desired 4-digit password from 0000 to 9999 that must be entered to enable the transceiver.

When the "Stun" function activates to disable the transceiver, password input is necessary regardless of this setting.

• PWR ON Password

- This item turns the password function OFF and ON.

When the function is turned ON, a 4-digit password input is necessary at power ON.

• Transceiver Data Out

- This item enables or inhibits reading the transceiver's memory contents with both using this software and cloning between transceivers.

- This function does not inhibit data writing, therefore, data overwriting is still possible when this item is set to "Inhibit".

Auto Reset

• Timer A/B

LMR

These settings are needed for the "Auto Reset" setting in the Memory Channel screen.

Set the time period to return to the mute function mode after receiving (or key operation) is finished, then assign to each operating channel in the Memory Channel screen.

To turn OFF the Auto Reset function: Set one of these to OFF (input 0).

PMR/BIIS PMR

These settings are needed for the "Auto Reset" setting in the Memory Channel screen.

Set the time period to return to "Inaudible" mode after receiving (or key operation) is finished, then assign to each operating channel in the Memory Channel screen.

To turn OFF the Auto Reset function: Set one of these to OFF (input 0).

• Inactive Timer (PMR)

- This setting is needed for the "Auto Reset" setting in the Memory Channel screen.

Set the time period to return to "Inaudible" mode after "Audible" mode is selected.

To turn OFF the inactive timer function: Do not assign "Inactive" in the Memory Channel screen.

TOT/Lockout

• TOT Timer

 - The TOT timer function inhibits continuous transmissions longer than this set period.

• NOTE: Do not set "0 sec.", otherwise transmitting will be impossible.

• Penalty Timer

 - The TOT penalty timer is the period that the transmission is inhibited when the TOT is activated.

• DTMF ID Out/5TONE ID Out

LMR:

The TOT ID out function automatically transmits an ID code (DTMF code) when the TOT activates and just before transmission is inhibited when this setting is turned ON.

The ID code can be set in the DTMF autodialing screen.

PMR/BIIS PMR:

The TOT ID out function automatically transmits a 5Tone ID code when the TOT activates and just before transmission is inhibited when this setting is turned ON.

The 5Tone ID code must be set for each channel in the Memory Channel screen.

• NOTE: This function does not available in MSK channel.

• TOT Beep

 - The transceiver emits warning beeps 10 sec. before the TOT activates when this setting is turned ON.

• Lockout Penalty Timer

 - The lockout penalty timer is the period that the transmission is inhibited when the user attempts to transmit while in a lockout condition.

The transmission is inhibited for the lockout penalty time even when the lockout condition is cleared.

5TONE/MSK Auto TX (BIIS PMR version only)

• Auto TX Timer

Sets the transceiver to the transmit condition (by activating the microphone) when receiving a matched 5Tone/Status call.

EPTT

• EPTT Delay Timer

This item sets the transmit time prolongation, after the received signal disappeared.

• Tone Mute EPTT

This item sets the CTCSS or DTCS tone on the transmit condition.

ON: Cut the CTCSS or DTCS tone encoder.

OFF: Tone encoder works as set condition.

• NOTE:

EXO, EXO Delay Timer, EPTT Delay Timer and Tone Mute EPTT functions are prepared for simplified repeater system which constructed with IC-F510/F520/F610/F620 series transceivers.

RS-232C (BIIS PMR version only)

• Connection Speed

Set the connection speed when using the OPC-822 connected RS-232C port of the equipment.

Selectable value:

1200, 2400, 4800, 9600 and 19200

• Mode

Set the equipment which has RS-232C port connected the OPC-822.

Selectable value:

OFF, Printer, GPS and PC CMD

EXO/Horn

• EXO

Selects the HORN terminal condition, when an optional OPC-617 is connected.

OFF (Works as car horn driver):

Activates an external buzzer, horn, etc., when receiving a matched 5-tone.

ON:

Goes to ground when receiving a signal.

An optional cable, OPC-617 and external connection is necessary.

Activates an external buzzer, horn honk, etc., when receiving a matched 5-tone.

The activation time can be set in the following EXO/Horn timer item.

• EXO Delay Timer

When the EXO function is turned ON, the Horn terminal of the optional OPC-617 cable is grounded for this period when receiving a signal.

• EXO/Horn Timer

When the EXO or Horn function is turned ON, the Horn terminal of the optional OPC-617 cable is grounded for this period when receiving a matched 5Tone or Status.

Scrambler

• Type

Set the UT-110 Rolling type scrambler as UT-109 Non-rolling type. As UT-110 and UT-109 have different code settings, they are not compatible.  By selecting Non-rolling type in this item, you can use UT-110 as UT-109.

Selectable value: Rolling (UT-110 normal) or Non-rolling (UT-110 works as UT-109)

• NOTE:

1. This item is invalid for UT-109.

2. The following setting will be invalid; Scrambler Group Code

• Group Code

 Set the Scrambler Group code number. available number: 1 to 4

• NOTE: This item is invalid for UT-109.

• Synchronous Capture

"Synchronous capture mode" is useful when communicating through a repeater.

However, because of voice components, the transceiver cannot maintain synchronous mode in rare cases.

Normally it is best to set this item to "Standard".

Selectable value: Standard (normal operation) or Continuous (repeater operation)

• Tone Start Timing

Tone start timing selects the synchronous tone signal transmission delay time.

Set the delay time when the other party's transceiver has power save mode.

Selectable value: OFF (default), 300 ms, 600 ms and 1100 ms

Emergency

• Emer SW ON Timer

This item sets the period for which the [EMER] key must be held to activate the emergency function.

To transmit an emergency call, push and hold the [EMER] key for the set period.

• Emer SW OFF Timer

This item sets the period for which the [EMER] key must be held to cancel an emergency call.

To cancel an emergency call, push and hold the [EMER] key for the set period before emergency transmission.

However, once the emergency call is transmitted, the call cannot be canceled regardless of this setting.

• Emer Start/Repeat

This item sets the delay and interval periods for the emergency call.

When the [EMER] key is pushed and held, the transceiver transmits an emergency call after the set period.

When the [Emergency Repeat] is used, the transceiver transmits repeatedly at this interval until an "emergency cancel" code is received.


 Character Editor

Edit the original character

- Left click the desired thumbnail (%10 to %1F) then right click to display the Edit menu.

- Left click [Edit... Enter] then the Character Editor screen appears. Edit the segments with Left click in the Editor palette (14 segments are available).

•	Left click to the white segments then black segments appear.

•	Left click to the black segments then white segments appear.

- Select an appropriate item. Then right click to display the [Edit... Enter] menu and select Copy, Paste, Up and Down.

* Double clicking the desired thumbnail (%10 to %1F) in the screen also enters the Character Editor screen.


 Atr

A: Priority A

1. One push selection with the [Prio A] or [Prio A (Rewrite)] key.

2. Monitored during priority scan.

3. Priority channel A can be reassigned by pushing the [Prio A (Rewrite)] key for 1 sec.

4. Priority channel A can be assigned by turning power ON.

B: Priority B

One push selection with the [Prio B] key.

E: Emergency

Emergency transmission channel selection with the [Emergency Single], [Emergency Single (Silent)], [Emergency Repeat], [Emergency Repeat (Silent)] key.

• NOTE:

Specify the emergency channel when an emergency call is transmitted on the channel.

Emergency OFF

When there is no emergency channel, emergency transmission is performed on the operating channel.

SmarTrunk ON/OFF

Turn the SmarTrunk function ON/OFF.

• NOTE:

- An optional UT-105 is required to use the SmarTrunk mode.

- SmarTrunk mode can be selected for each bank. "S" appears when SmarTrunk mode is selected.


 Inh

Select "Inh" to inhibit the channel indication on the display.

Selectable value

Appear: Displays the channel information.

Inhibit: Inhibits the channel indication.


 Frequency(MHz)

• RX/TX

Enter the specified receive and transmit frequencies in RX and TX columns respectively, given from the system.

When the network uses multiple frequency blocks, enter the base channels.

 //Usable frequency range//

IC-F500 series:

136 to 174 MHz

IC-F600 series:

L-band type	400 to 430 MHz

M-band type	440 to 490 MHz

H-band type	480 to 512 MHz or 480 to 520 MHz

• TX Inh

Inhibit the transmission on this channel.


 W/N

- Each channel can be set to wide/narrow for both receive IF bandwidth and transmitter modulation.

- "Wide" or "Narrow" appears depending on the selection.


 C.Tone

• RX/TX

For CTCSS frequency selection:

Select an appropriate item. Then right click to display the [Edit... Enter] menu and select Copy, Paste, Up, Down Clear, Delete and Insert.

Click [Edit... Enter] to display the CTCSS frequency table.

- Select appropriate tone frequency.

- Select "USER" to use user CTCSS frequency.

- Select "DTCS" to use DTCS tone code.

For DTCS selection: (Recommend code list is as below.)

Enter desired 3digits code number directly.

N: for normal polarity

I: for inverse polarity.

• NOTE:

Set TAC, Call/Ack LET timer (in MSK-Timing&Error) desired time plus 300 m sec. larger to use CTCSS/DTCS in MSK channel.


Text

Select an appropriate number. Then right click to display the [Edit... Enter] menu and click [Edit... Enter].

Double click the desired characters from the table.

• Push [Space] to pick up the character .

• Push [Enter] to finish editing.

Max. 10 characters are selectable.

Selectable character list is as below.

- You can select the character that is edited in the Character Editor Screen.


 Compander

- Turn the voice compander ON or OFF.


 TOT

The TOT timer function inhibits continuous transmissions longer than the TOT Timer set period in Common screen.

Select the TOT timer function OFF or ON

RELATED SETTINGS:

• TOT Timer

• Penalty timer

• DTMF/5Tone ID Out

• TOT Beep


 RF Pwr

Select the RF output power for individual channels.

Selectable value: L1 (Low1). L2 (Low2) or H (High)


 Lock-out

This function restricts transmission as follows:

OFF

No restriction for receiving a signal.

Busy: Busy Lockout

Transmission is inhibited while receiving a signal.

Rpt      : Repeater Lockout (LMR)

Rpt1, 2: Repeater Lockout (1), (2) (PMR)

Transmission is permitted only while:

- Receiving a matched CTCSS (or DTCS) tone

- Receiving no signal


 Scan List

This item assigns scan list number(s) to a selected channel. Channels in scan lists align vertically in the column.

In addition, the [Scan add/del (Tag)] key modifies the assignment from the transceiver front panel. This item includes inhibition of such modification.

• Scan List

Double-click the check-box [1] to [0] to toggle the selection. The indicated number is assigned the scan list number.

• Inc (Include)

Select the scan list modification between "inhibit" and "Enable".


Signal

Set the using communication channel as MSK channel or 5T (5Tone) channel.


 Auto Reset

The transceiver restarts the PWR ON Scan for specified time (Timer A or Timer B) after signal disappears or key operation is finished.

MSK channel clear down automatically with this function when receiving the Clear Down signal is failed.

Selectable value;

Tim -A, Tim-B, Tim-AI or Tim-BI

(Tim-AI and Tim-BI : PMR only)

• NOTE:

To turn OFF the auto reset function, set the timer (Time-A or Time-B) to OFF (set to 0 sec.) in the Common screen.


 2Tone

1. Right click the desired channel.

2. Click [Edit...Enter], then following screen appears.

3. Make a selection in the screen.

* With only double clicking the desired channel, following screen appears.

Turns ON the 2Tone receive mute and specifies the RX code channel to the operating channel.

To turn OFF the setting, select OFF.

Selectable value: OFF, 1, 2 or 3


 Log

ID code (specified with DTMF code) is transmitted in relation to the PTT switch.

OFF

- No ID is transmitted with the [PTT].

L-IN: Log IN

- ID is transmitted each time [PTT] is pushed.

L-OFF: Log OFF

- ID is transmitted each time [PTT] is released.

Both: Log IN/OFF

- ID is transmitted each time [PTT] is pushed and released.


 Log-In/Off

ID code is transmitted in relation to the PTT switch.

OFF

- No ID is transmitted with the [PTT].

L-IN: Log-In

- ID is transmitted each time [PTT] is pushed.

L-INA: Log-In at Audible

- ID is transmitted when [PTT] is pushed in "Audible" mode.

- Own ID is transmitted when [PTT] is pushed in MSK channel.

L-INI: Log-In at Inaudible

- ID is transmitted when [PTT] is pushed in "Inaudible" mode.

* Voice transmission is impossible when in "Inaudible" mode is selected and "CH Mute = Single".

L-OFF: Log-OFF

- ID is transmitted each time [PTT] is released.

L-OFFA: Log-OFF at Audible

- ID is transmitted when [PTT] is released in "Audible" mode.

- Own ID is transmitted when [PTT] is released in MSK channel.

Both: Log IN/OFF

- ID is transmitted each time [PTT] is pushed and released.

BothA1: Log IN/OFF at Audible

- ID is transmitted each time [PTT] is pushed and released in "Audible" mode.

- Own ID is transmitted when [PTT] is pushed and released in MSK channel.

BothA2: Both A1 and L-INI

- ID is transmitted each time [PTT] is pushed and released in "Audible" mode.

- Inaudible mode is selected and "CH Mute=Single".

- ID is transmitted when [PTT] is pushed in "Audible" mode.


 CH Mute

This item selects:

1. Receive 5Tone/MSK mute ON or OFF.

2. PTT transmission inhibit in "Inaudible" mode.

CONT (Continuous Tone)

5Tone mute is OFF. (CTCSS or DTCS is usable for receive mute.)

SGL (Single Tone)

5Tone/MSK mute is ON or PTT mute is ON. (CTCSS or DTCS can be used together with 5Tone mute.)

• NOTE:

- The 5Tone decoder is activated for operation in the RX Code CH screen even when "CONT" is selected for this item.

- MSK mute is available in BIIS version only.


 Send Status

Select "Mobile" to transmit the status call to the current ID.

Select "Base" to transmit the status call to the base ID (Fixed Base ID).


 Switch Action

• Moni

OFF

- No function during "Inaudible" mode.

- Push and hold to open any mute condition.

Aud

- Push to select "Audible" mode.

- Push and hold to open any mute condition.

In_A

- Selects "Inaudible" mode.

In_A+R1 or In_A+R2

- Selects "Inaudible" mode.

- Transmits reset code.

- To exit the communication in MSK channel.

   After 'Clear Down' transmission, the audio mute will be activated.

Both

- Push to toggle between "Inaudible" and Audible". Push and hold to open any mute condition.

Both+R1 or Both+R2

- Push to toggle between "Inaudible" and "Audible". Push and hold to open any mute condition.

- Transmits reset code.

- To monitoring the communication in MSK channel.

   After 'Clear Down' transmission, the audio mute will be activated.

 // Reset Code //

Transmits TX 5Tone code channel 32 (for reset code 1) or 31 (for reset code 2) when switching from "Audible" to "Inaudible" with the [Moni] key to set the other station to "Inaudible" mode.

• Sel

OFF (Edit is inhibited on MSK channel)

Does not change even when selecting the channel.

Aud (Edit is inhibited on MSK channel)

CH Mute=SGL: Releases the 5Tone mute.

CH Mute=CONT: Turns OFF the CTCSS (or DTCS)

In_A

CH Mute=SGL: Activates the 5Tone mute.

CH Mute=CONT: Turns ON the CTCSS (or DTCS)

• Call

OFF

Does not change even when transmitting with 'Call'.

Aud (Edit is inhibited on MSK channel)

Select "Audible" mode after 'Call' transmission.

• PTT

OFF

Does not change even when [PTT] is pushed.

*This means [PTT] transmission is inhibited in "Inaudible" mode when using a 5Tone signaling system.

Aud (Edit is inhibited on MSK channel)

Selects "Audible" mode at the moment the [PTT] is pushed.


 MSK Signaling

• RPT ID

Select the MSK repeater ID to use the repeater in MSK channel.

Click the cell to indicate the list window and then make a selection.

Selectable value: OFF, 5T (5 Tone), xx (MSK Code)

• STN ID

Select the station ID in MSK channel.

Click the cell to indicate the list window and then make a selection.

• Receive ID

Double-click the check-box [1] to [7] to select the group number to receive the signal in MSK channel.


 5Tone Signaling

• Form

Select the 5Tone format.

- Available 5Tone forms;

USER, CCIR, ZVEI1, ZVEI2, DZVEI, EEA, EEA2, DAPL, EIA and DTMF

- A user tone can be specified in the USER TONE screen.

• RPT/STN/ID

When the [Call] key is pushed, the following 5Tone codes are transmitted in sequence.

These columns specify the TX code channel number used.

 RPT: Repeater code

 STN: Station code

 ID: ID code

* The sequence of these codes can be changed in the "ID Pos" column.

Selection method:

1. Edit the TX Code CH information contents in the 5Tone folder in advance.

2. Assign a TX code channel number to these codes.

3. Right click the "L" box, and then click [Edit... Enter] to open the Long Tone table.

    Click L: Long Tone, if desired.

    * "L" appears when the long tone is turned ON.

• NOTE:

- When STN (station) is turned OFF, the [Call] key does not function.

- The ID code can be turned OFF in the next column, "ID Pos". If the ID code is turned OFF in this column, "Log IN/OFF" and "TOT ID" function cannot be used.

• Pos

Set the sequence of the 5Tone code.

In addition, the 5Tone decoder (in RX Code CH) screen detects the station code (mute release) and ID code (for indication) in this sequence.

• RX C. No

Each RX Code channel can have various functions, such as answer back, beep, indication, etc., when a matched 5Tone code (station code) is received.

This column assigns the RX Code channel to the operating channel.  Up to 8 channel numbers can be assigned.

The group code channel is assigned regardless of this column's settings.

Selection method:

Push [1] to [8] to toggle the selection.

*Indicated channels are effective, non-indicated channels are not effective.


 Scrambler

• ON/OFF

Turn the scrambler function ON or OFF as an initial setting.

OFF : Turn the scrambler function OFF.

ON   : Turn the scrambler function ON.

Inh   : Scrambler function selection is inhibited.

• Code

Program the scrambler codes.

Available codes;

UT-109 (Non-rolling type) : 1 to 32

UT-110 (Rolling type) : 1 to 255

• NOTE:

- Set the scrambler group code in the Common screen in advance. (UT-110 only)

- UT-110 can be program the group number 1 to 4. Then totality 1020 (4 group * 255) code numbers are available.

- Set the scrambler type in the Common screen. By selecting Non-rolling type in this item, you can use UT-110 as UT-109.


Display Text

Select an appropriate number. Then right click to display the [Edit... Enter] menu and click [Edit... Enter].

Double click the desired characters from the table.

• Push [Space] to pick up the character .

• Push [Enter] to finish editing.

Max. 10characters are selectable.

Selectable character list is as below.

- You can select the character that is edited in the Character Editor Screen.